\documentclass[11pt]{article}
\usepackage{graphicx}

\def\nbpdfInput#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfEcho#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfPrint#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfText#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfMessage#1{}
\def\nbpdfOutput#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfSubsection#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfSubsubsection#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfgraphInput#1{\vskip 1mm\par\noindent\includegraphics{#1}}
\def\nbpdfgraphOutput#1{\vskip 1mm\par\noindent\includegraphics[width=1.5in]{#1}}

\begin{document}

This is my thesis.

And here is the code:

\input{GassnerFomulas@2.tex}

And now let's move on to the next chapter.

\end{document}